%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Lee2008} Lee, S., \& Dron, J. (2008). Giving Learners Control through Interaction Design. \textit{the E-Learn}, .

\end{thebibliography}

\end{document}

