%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Viola2006} Viola, S. R., Graf, S., Kinshuk, \& Leo, T. (2006). Analysis of Felder-Silverman Index of Learning Styles by a Data-driven Statistical Approach. International Workshop on Multimedia Technologies for E-Learning (MTEL 2006). In \textit{Proceedings of the IEEE International Symposium on Multimedia} (pp. 959--964). San Diego, USA: IEEE Computer Society.

\end{thebibliography}

\end{document}

