%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{Book Contributions}

\subsection*{2012}

Kinshuk, \& Graf, S. (2012). Ubiquitous Learning. (pp. 3361--3363). Encyclopedia of the Sciences of Learning. Springer US.

\end{document}

